288.8 289 289.2 289.4 289.6

2325

2330

2335

2340

2345

2350

2355

2360

2365

2370

2375

04OCT14XE_N004 (r4143): SVETLOE

Zenith Total Delay [mm]

Day of 2004 bkg cgs cnr dgf gsf iaa igg mao oso IVS