24.8 25 25.2 25.4 25.6

2040

2060

2080

2100

2120

2140

2160

2180

05JAN24XA_N004 (r1159): WETTZELL

Zenith Total Delay [mm]

Day of 2005 bkg cgs cnr dgf gsf iaa igg mao oso IVS