326.8 327 327.2 327.4 327.6

2450

2460

2470

2480

2490

2500

2510

2520

2530

2540

2550

05NOV22XE_N004 (r4199): FORTLEZA

Zenith Total Delay [mm]

Day of 2005 bkg cgs cnr dgf gsf iaa igg mao oso IVS