26.8 27 27.2 27.4 27.6

1990

1995

2000

2005

2010

2015

2020

2025

2030

2035

06JAN26XE_N004 (r4208): ZELENCHK

Zenith Total Delay [mm]

Day of 2006 bkg cgs cnr