79.8 80 80.2 80.4 80.6

2560

2580

2600

2620

2640

2660

2680

06MAR20XA_N004 (r1216): FORTLEZA

Zenith Total Delay [mm]

Day of 2006 bkg cgs cnr dgf gsf iaa igg mao oso IVS