46.8 47 47.2 47.4 47.6

2600

2610

2620

2630

2640

2650

2660

07FEB15XE_N004 (r4263): FORTLEZA

Zenith Total Delay [mm]

Day of 2007 bkg cgs dgf iaa igg mao IVS