228.8 229 229.2 229.4 229.6

2250

2300

2350

2400

2450

2500

2550

2600

2650

2700

2750

07AUG16XE_N004 (r4289): WETTZELL

Zenith Total Delay [mm]

Day of 2007 bkg cgs dgf iaa igg mao IVS