143.8 144 144.2 144.4 144.6

2190

2200

2210

2220

2230

2240

08MAY22XE_N004 (r4329): WETTZELL

Zenith Total Delay [mm]

Day of 2008 bkg cgs dgf gsf iaa igg mao IVS