227 227.2 227.4 227.6 227.8 228

2550

2600

2650

2700

2750

2800

2850

2900

2950

3000

08AUG14XA_N004 (c0803): TSUKUB32

Zenith Total Delay [mm]

Day of 2008 bkg cgs gsf iaa mao IVS