294.8 295 295.2 295.4 295.6

1750

1800

1850

1900

1950

2000

2050

2100

2150

08OCT20XA_N004 (r1349): KOKEE

Zenith Total Delay [mm]

Day of 2008 bkg cgs dgf gsf iaa igg mao IVS