339.8 340 340.2 340.4 340.6

2040

2050

2060

2070

2080

2090

2100

2110

2120

2130

2140

08DEC04XE_N004 (r4355): KOKEE

Zenith Total Delay [mm]

Day of 2008 bkg cgs dgf gsf iaa igg mao IVS