117.8 118 118.2 118.4 118.6

2125

2130

2135

2140

2145

2150

2155

2160

2165

2170

09APR27XA_N004 (r1376): BADARY

Zenith Total Delay [mm]

Day of 2009 bkg cgs dgf gsf iaa mao IVS