253.8 254 254.2 254.4 254.6

2240

2260

2280

2300

2320

2340

2360

09SEP10XE_N005 (r4395): WETTZELL

Zenith Total Delay [mm]

Day of 2009 bkg cgs dgf gsf iaa igg ina mao IVS