337.8 338 338.2 338.4 338.6

2050

2100

2150

2200

2250

2300

2350

09DEC03XE_N005 (r4407): TIGOCONC

Zenith Total Delay [mm]

Day of 2009 bkg cgs dgf gsf iaa igg ina mao IVS