340.8 341 341.2 341.4 341.6

2245

2250

2255

2260

2265

2270

2275

2280

2285

2290

10DEC06XA_N004 (r1460): NYALES20

Zenith Total Delay [mm]

Day of 2010 bkg cgs dgf iaa ina mao IVS