343.8 344 344.2 344.4 344.6

2165

2170

2175

2180

2185

2190

2195

2200

2205

2210

2215

10DEC09XE_N004 (r4460): WETTZELL

Zenith Total Delay [mm]

Day of 2010 bkg cgs dgf iaa ina mao IVS