300.8 301 301.2 301.4 301.6

2510

2520

2530

2540

2550

2560

2570

2580

2590

2600

2610

11OCT27XE_N004 (r4504): KATH12M

Zenith Total Delay [mm]

Day of 2011 bkg cgs dgf iaa ina mao IVS