215.8 216 216.2 216.4 216.6

2130

2140

2150

2160

2170

2180

2190

12AUG02XE_N004 (r4544): YEBES40M

Zenith Total Delay [mm]

Day of 2012 bkg cgs dgf iaa ina mao IVS