299.8 300 300.2 300.4 300.6

2200

2300

2400

2500

2600

2700

2800

2900

12OCT25XE_N004 (r4556): WETTZELL

Zenith Total Delay [mm]

Day of 2012 bkg cgs dgf iaa ina mao IVS