355.8 356 356.2 356.4 356.6

1795

1800

1805

1810

1815

1820

1825

1830

1835

1840

1845

12DEC20XE_N004 (r4564): URUMQI

Zenith Total Delay [mm]

Day of 2012 bkg cgs dgf iaa ina mao IVS