164.8 165 165.2 165.4 165.6

2200

2220

2240

2260

2280

2300

2320

2340

13JUN13XE_N004 (r4589): WETTZELL

Zenith Total Delay [mm]

Day of 2013 bkg cgs dgf iaa ina IVS