41.8 42 42.2 42.4 42.6

2350

2400

2450

2500

2550

2600

2650

2700

2750

2800

14FEB10XA_N004 (r1624): FORTLEZA

Zenith Total Delay [mm]

Day of 2014 bkg cgs iaa igg IVS