135 135.2 135.4 135.6 135.8 136

2270

2275

2280

2285

2290

2295

2300

2305

2310

2315

2320

14MAY15XA_N005 (c1410): NYALES20

Zenith Total Delay [mm]

Day of 2014 bkg iaa IVS