204.8 205 205.2 205.4 205.6

2090

2100

2110

2120

2130

2140

2150

2160

2170

15JUL23XE_N004 (r4697): ZELENCHK

Zenith Total Delay [mm]

Day of 2015 bkg cgs dgf iaa igg IVS