356.8 357 357.2 357.4 357.6

2290

2300

2310

2320

2330

2340

2350

2360

15DEC22XE_N004 (r4719): SVETLOE

Zenith Total Delay [mm]

Day of 2015 bkg cgs dgf iaa igg IVS