35.8 36 36.2 36.4 36.6

2220

2230

2240

2250

2260

2270

2280

2290

2300

2310

16FEB04XE_N004 (r4725): SVETLOE

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf igg IVS