77.8 78 78.2 78.4 78.6

2230

2240

2250

2260

2270

2280

2290

2300

16MAR17XE_N004 (r4731): SVETLOE

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa igg IVS