214.8 215 215.2 215.4 215.6

2550

2560

2570

2580

2590

2600

2610

2620

2630

2640

2650

16AUG01XA_N004 (r1751): TSUKUB32

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa igg IVS