270.8 271 271.2 271.4 271.6

2340

2360

2380

2400

2420

2440

2460

2480

16SEP26XA_N004 (r1759): ONSALA60

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa igg IVS