336.8 337 337.2 337.4 337.6

1810

1820

1830

1840

1850

1860

1870

1880

1890

16DEC01XE_N004 (r4768): URUMQI

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf igg IVS