33.8 34 34.2 34.4 34.6

2510

2520

2530

2540

2550

2560

2570

2580

17FEB02XE_N004 (r4777): FORTLEZA

Zenith Total Delay [mm]

Day of 2017 bkg cgs dgf iaa IVS