68.8 69 69.2 69.4 69.6

2280

2300

2320

2340

2360

2380

2400

2420

2440

2460

17MAR09XE_N004 (r4782): YARRA12M

Zenith Total Delay [mm]

Day of 2017 bkg iaa IVS