170.8 171 171.2 171.4 171.6

2360

2370

2380

2390

2400

2410

2420

2430

2440

17JUN19XA_N004 (r1797): SEJONG

Zenith Total Delay [mm]

Day of 2017 bkg cgs iaa IVS