201.8 202 202.2 202.4 202.6

1955

1960

1965

1970

1975

1980

1985

1990

1995

2000

17JUL20XE_N004 (r4801): HART15M

Zenith Total Delay [mm]

Day of 2017 bkg iaa IVS