32.8 33 33.2 33.4 33.6

2126

2128

2130

2132

2134

2136

2138

2140

2142

2144

2146

18FEB01XE_N004 (r4827): BADARY

Zenith Total Delay [mm]

Day of 2018 bkg cgs iaa IVS