60.8 61 61.2 61.4 61.6

2310

2320

2330

2340

2350

2360

2370

2380

2390

2400

2410

18MAR01XE_N004 (r4831): YARRA12M

Zenith Total Delay [mm]

Day of 2018 bkg cgs iaa IVS